DROP TABLE IF EXISTS login_config;
CREATE TABLE login_config (
	id           INTEGER PRIMARY KEY,
	config_name  TEXT    NOT NULL DEFAULT '',
	config_value TEXT    NOT NULL DEFAULT ''
);

INSERT INTO login_config VALUES
(1,'login_heartbeat','1582776503'),
(2,'max_server_offline_age','604800'),
(3,'max_characters_per_account','30'),
(4,'max_level_for_vet_reward','20'),
(5,'max_characters_per_account','30');
